Feel the Beat?

Something terrible happened to me while I was running the Ravenel Bridge last night. About halfway through my run… my iPod died. I don’t know about you, but I pretty much rely on my running playlists to get me through my runs—especially those steep hills on the Ravenel. So when Beyonce cut off mid-chorus, I knew I was in trouble.